                            Local and Global Variables


   Local - Local variables are defined and changed from the Enter line.
           Example: INTEREST=.085*36
           Up to 50 local variables allowed per work sheet.

  Global - Global variables are defined and changed by using the F8 key.
           Use V)iew to show formulas and comments from the Enter line.
           Up to 100 global variables allowed per global file.


           Three ways to Load Global Variable Files into Memory

       1 - Use the F8 key.

       2 - From the Enter line type  LOAD_file-name.

       3 - From within a local or global variable include  LOAD_file-name 
           in the formula.  Example: /10+LOAD_METRIC+100*KM\MILE.

 
                                                                           



